[arabic]
. https://fwd.aws/mm853[Launch the Quick Start] into your AWS account.

The template is launched in the US West (Oregon) region by default. You
can change the region by using the region selector in the navigation
bar.

This stack takes approximately 5 minutes to create.

*Note* You are responsible for the cost of the AWS services used while
running this Quick Start reference deployment. There is no additional
cost for using this Quick Start. See the pricing pages for each AWS
service you will be using in this Quick Start for full details.

[arabic, start=4]
. On the *Select Template* page, keep the default setting for the Amazon
S3 template URL, and then choose *Next*.
. On the *Specify Details* page, review the following parameters for the
template, provide values for parameters that require your input, and
customize the default settings as necessary. For example, you can change
the network configuration parameters if you want to reconfigure the
subnet segmentation used for the VPC, as discussed earlier in the
link:#subnet_sizing[Subnet Sizing] section.