/*
 Copyright 2017 Amazon.com

  Licensed under the Apache License, Version 2.0 (the "License");
  you may not use this file except in compliance with the License.
  You may obtain a copy of the License at

    http://www.apache.org/licenses/LICENSE-2.0

  Unless required by applicable law or agreed to in writing, software
  distributed under the License is distributed on an "AS IS" BASIS,
  WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
  See the License for the specific language governing permissions and
  limitations under the License.
*/


USE master;  
GO  
ALTER DATABASE dms_sample  
   SET RECOVERY FULL;  
GO  
-- Create AdvWorksData and AdvWorksLog logical backup devices.   
USE master  
GO  
EXEC sp_addumpdevice 'disk', 'dms_sample_backup',   
'C:\$(BACKUPDIR)\dms_sample.bak';  
GO  
EXEC sp_addumpdevice 'disk', 'dms_sample_log',   
'C:\$(BACKUPDIR)\dms_sample_log.bak';  
GO  
  
-- Back up the full dms_sample database.  
BACKUP DATABASE dms_sample TO dms_sample_backup;  
GO  
-- Back up the dms_sample log.  
BACKUP LOG dms_sample  
   TO dms_sample_log;  
GO 
