USING EXTERNAL FUNCTION grid_distance(start BIGINT, en BIGINT)
RETURNS BIGINT
LAMBDA '<ARN>'
SELECT 613499565412188159 as cell1, 613499457337556991 as cell2 , grid_distance(613499565412188159, 613499457337556991) AS distance