+++
title = "ROSA cluster deletion"
chapter = false
weight = 1
+++



:imagesdir: /images

## Deleting a ROSA Cluster

To delete a ROSA cluster follow the steps below.

Step 1:: List the clusters 

----
rosa list clusters
----

Step 2:: Delete the cluster

----
rosa delete cluster -c <clustername>
----

It will prompt you to confirm that you want to delete it. Press “y” then enter. The cluster will be deleted and all associated infrastructure. **THIS IS NON-RECOVERABLE.**


If you want to completely remove all associated aspects of the ROSA service (such as stack templates) you can run 

----
Update linkedin
rosa init --delete-stack
----


