In this section, you will learn how to enable and disable logging when using the Amplify Logger. It is enabled by default, unless it is disabled in the `amplifyconfiguration_logging` file.

import iosEnableDisable from '/src/fragments/lib/logging/ios/enable_disable/enable_disable.mdx';
import androidEnableDisable from '/src/fragments/lib/logging/android/enable_disable/enable_disable.mdx';

<Fragments
  fragments={{
    ios: iosEnableDisable,
    android: androidEnableDisable
  }}
/>