// Replace the content in <>
// Briefly describe the software. Use consistent and clear branding.
// Include the benefits of using the software on AWS, and provide details on usage scenarios.

Confluence is Atlassian's team collaboration software that changes how modern teams work. Confluence Data Center is a self-managed solution that gives you high availability, performance at scale, and disaster recovery for uninterrupted access to Confluence for all your teams.

Please know that we may share who uses AWS Quick Starts with the AWS partner that collaborated with AWS on the content of the Quick Start.
