:quickstart-project-name: quickstart-compliance-hipaa
:partner-product-name: HIPAA Reference Architecture
// For the following attribute, if you have no short name, enter the same name as partner-product-name.
:partner-product-short-name: HIPAA Reference Architecture
// If there's no partner, comment partner-company-name and partner-contributors.
//:partner-company-name: Example Company Name, Ltd.
:doc-month: June
:doc-year: 2021
// Uncomment the following "contributor" attributes as appropriate. If the partner agrees to include names, enter contributor names for every line we use. If partner doesn't want to include names, delete all placeholder names and keep only "{partner-company-name}" and "AWS Quick Start team." 
//:partner-contributors: Shuai Ye, Michael McConnell, and John Smith, {partner-company-name}
//:other-contributors: Akua Mansa, Trek10
:aws-contributors: Tom Burge, Justin Stanley, Donny Wilson, Kevin Cox, Rich Nahra, Bakha Nurzhanov, and Vanessa Jacobs, AWS Healthcare team
:quickstart-contributors: Andrew Gargan, AWS Quick Start team
// For deployment_time, use minutes if deployment takes an hour or less,
// for example, 30 minutes or 60 minutes.
// Use hours for deployment times greater than 60 minutes (rounded to a quarter hour),
// for example, 1.25 hours, 2 hours, 2.5 hours.
:deployment_time: 15 minutes
:default_deployment_region: us-east-1
:parameters_as_appendix:
:compliance-statement: Deploying this Quick Start does not guarantee an organization’s compliance with any laws, certifications, policies, or other regulations.
// Uncomment the following two attributes if you are using an AWS Marketplace listing.
// Additional content will be generated automatically based on these attributes.
// :marketplace_subscription:
// :marketplace_listing_url: https://example.com/

