
.Network configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Permitted IP range
(`AccessCIDR`)|`**__Requires input__**`|The CIDR IP range that is permitted to access Vault Note: A value of 0.0.0.0/0 allows access from ANY IP address.|First subnet ID for Auto Scaling group
(`PrivateSubnet1ID`)|`**__Requires input__**`|NO_DESCRIPTION|Second subnet ID for Auto Scaling group
(`PrivateSubnet2ID`)|`**__Requires input__**`|NO_DESCRIPTION|Third subnet ID for Auto Scaling group
(`PrivateSubnet3ID`)|`**__Requires input__**`|NO_DESCRIPTION
|===
.HashiCorp Vault Configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|HashiCorp Vault version
(`VaultVersion`)|`1.5.3`|NO_DESCRIPTION|HashiCorp Vault deployment size
(`VaultDeploymentSize`)|`small`|Deployment size of dedicated HashiCorp Vault nodes.|**NO_LABEL**
(`KubernetesNameSpace`)|`vault-server`|Kubernetes namespace for HashiCorp Vault server.|Internal or external load balancer?
(`LoadBalancerType`)|`Internal`|Choose whether the load balancer for HashiCorp Vault is internal or external to the VPC.|Load balancer DNS name
(`DomainName`)|`**__Requires input__**`|Fully qualified DNS name for the vault-ui service load balancer. If you don't provide a value for "ACM SSL certificate ARN", use the HostedZoneID.|Route 53 hosted zone id
(`HostedZoneID`)|`**__Requires input__**`|Route 53-hosted zone ID of the domain name. If you don't provide an ACMSSLCertificateArn value, the Quick Start creates an ACM certificate for you using HostedZoneID in conjunction with DomainName.|ACM SSL certificate ARN
(`ACMSSLCertificateArn`)|`**__Requires input__**`|ARN of the load balancer's ACM SSL certificate. If you don't provide values for "Domain name" and "Hosted zone id", provide a value for "ACM SSL certificate ARN".|HashiCorp Vault server nodes
(`Nodes`)|`3`|The number of dedicated Vault server nodes and pods.
|===
.Quick Start Configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Quick Start S3 bucket name
(`QSS3BucketName`)|`aws-quickstart`|S3 bucket name for the Quick Start assets. Quick Start bucket name can include numbers, lowercase letters, uppercase letters, and hyphens (-). It cannot start or end with a hyphen (-).|Quick Start S3 bucket Region
(`QSS3BucketRegion`)|`us-east-1`|The AWS Region where the Quick Start S3 bucket (QSS3BucketName) is hosted. When using your own bucket, you must specify this value.|Quick Start S3 object key prefix
(`QSS3KeyPrefix`)|`quickstart-eks-hashicorp-vault/`|S3 key prefix for the Quick Start assets. Quick Start key prefix can include numbers, lowercase letters, uppercase letters, hyphens (-), and forward slash (/).
|===