
.Iridium CloudConnect configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Iridium Role ARN
(`IridiumRoleARN`)|`**__Requires input__**`|Amazon Resource Number (ARN) of the role in the Iridium AWS account.|Mobile-originated queue name
(`MobileOriginatedQueueName`)|`ICCMO.fifo`|Name of the mobile-originated queue in Amazon SQS.|Mobile-terminated queue name
(`MobileTerminatedQueueName`)|`ICCMT.fifo`|Name of the mobile-terminated queue in Amazon SQS.|Mobile-terminated confirmation queue name
(`MobileTerminatedConfirmationQueueName`)|`ICCMTConfirmation.fifo`|Name of the mobile-terminated confirmation queue in Amazon SQS.|Mobile-terminated error queue name
(`MobileTerminatedErrorQueueName`)|`ICCMTErrors.fifo`|Name of the mobile-terminated error queue in Amazon SQS.
|===