
.Network configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|**NO_LABEL**
(`VPC`)|`**__Requires input__**`|The VPC to which the Amazon MSK cluster is deployed.|Subnet ID of VPC
(`SubnetId`)|`**__Requires input__**`|Subnet ID of an existing subnet (for the primary network) in your VPC.
|===
.Lenses network
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|**NO_LABEL**
(`LensesLocation`)|`**__Requires input__**`|Enter the inbound IP address range in CIDR format `x.x.x.x/x`. *Note:* To allow one specific IP address, set to `x.x.x.x/32`. To allow all IP addresses, enter `0.0.0.0/0`.
|===
.Lenses (required)
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|**NO_LABEL**
(`InstanceType`)|`t2.large`|Lenses EC2 instance type.
|===
.Amazon MSK (required)
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Cluster ARN
(`MSKClusterARN`)|`**__Requires input__**`|MSK cluster Amazon Resource Name (ARN).|Cluster security group
(`MSKSecurityGroup`)|`**__Requires input__**`|MSK cluster security group ID.
|===
.Amazon MSK SASL/ SCRAM (optional)
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|MSK associated MSKSecretNameSecret
(`MSKSecretName`)|`**__Requires input__**`|SASL/SCRAM secret name.|**NO_LABEL**
(`MSKSecretDecryptionKMSKey`)|`**__Requires input__**`|The AWS Key Management Service (AWS KMS) symmetric customer master key (CMK) used to decrypt the secret.
|===
.Services (optional)
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Schema registry JSON (optional)
(`SchemaRegistryURLs`)|`**__Requires input__**`|Schema registry nodes. For more information, see https://docs.lenses.io/4.1/configuration/schema-registry/[Schema Registry^].|Connect JSON (optional)
(`ConnectURLs`)|`**__Requires input__**`|Connect nodes. For more information, see https://docs.lenses.io/install_setup/configuration/lenses-config.html#kafka-connect"
|===
.Monitoring
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Cloudwatch metrics
(`CloudWatchMetrics`)|`No`|Select *Yes* to forward Lenses metrics to CloudWatch.
|===
.Lenses storage
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Lenses storage type
(`LensesStorage`)|`local`|Storage mode.|Postgres hostname
(`StoragePostgresHostname`)|`**__Blank string__**`|If storage is PostgreSQL, enter the hostname.|Postgres username
(`StoragePostgresUsername`)|`**__Blank string__**`|PostgreSQL username. Required if storage is PostgreSQL.|Postgres password
(`StoragePostgresPassword`)|`**__Blank string__**`|If storage is PostgreSQL, enter the password.|Postgres database
(`StoragePostgresDatabase`)|`**__Blank string__**`|If storage is PostgreSQL, enter the database name.
|===