:quickstart-project-name: quickstart-microsoft-rdgateway
:partner-product-name: Remote Desktop Gateway
:partner-product-short-name: RD Gateway
:partner-company-name: Microsoft
:doc-month: January
:doc-year: 2021
//:partner-contributors: 
:quickstart-contributors: Dave May and Santiago Cardenas, Solutions Architects, AWS Quick Start team
:deployment_time: 20 minutes
:default_deployment_region: us-east-1
:parameters_as_appendix:
// Uncomment these two attributes if you are leveraging
// - an AWS Marketplace listing.
// Additional content will be auto-generated based on these attributes.
// :marketplace_subscription:
// :marketplace_listing_url: https://example.com/
