
.Network configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Availability Zones
(`AvailabilityZones`)|`**__Requires input__**`|List of Availability Zones to use for the subnets in the VPC. Note: The logical order is preserved and 2 zones must be provided unless the Third Availability Zone parameter is specified, in which case 3 zones must be provided.|VPC CIDR block
(`VPCCIDR`)|`10.0.0.0/16`|CIDR block for the VPC.|Public subnet 1 CIDR
(`PublicSubnet1CIDR`)|`10.0.128.0/20`|CIDR block for the public subnet 2 located in Availability Zone 2.|Public subnet 2 CIDR
(`PublicSubnet2CIDR`)|`10.0.144.0/20`|CIDR block for the optional public subnet 3 located in Availability Zone 3.|Private subnet 1 CIDR
(`PrivateSubnet1CIDR`)|`10.0.0.0/19`|CIDR block for private subnet 1 located in Availability Zone 1.|Private subnet 2 CIDR
(`PrivateSubnet2CIDR`)|`10.0.32.0/19`|CIDR block for private subnet 2 located in Availability Zone 2.
|===
.Remote Desktop Gateway configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Allowed RDGW external access CIDR
(`RDGWCIDR`)|`**__Requires input__**`|Allowed CIDR block for external access to the Remote Desktop Gateway instances.|Number of RDGW hosts
(`NumberOfRDGWHosts`)|`1`|Enter the number of Remote Desktop Gateway hosts to create.|RDGW instance type
(`RDGWInstanceType`)|`t2.large`|Amazon EC2 instance type for the Remote Desktop Gateway instances.
|===
.Active Directory configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|AD scenario type
(`ADScenarioType`)|`AWS Directory Service for Microsoft AD (Enterprise Edition)`|Select the type of AD DS deployment to use: AWS Directory Service for Microsoft AD or managing your own Amazon EC2 AD instances.|Domain DNS name
(`DomainDNSName`)|`example.com`|Fully qualified domain name (FQDN) of the forest root domain.|Domain NetBIOS name
(`DomainNetBIOSName`)|`example`|NetBIOS name of the domain (up to 15 characters) for users of earlier versions of Windows.|Domain admin user name
(`DomainAdminUser`)|`Admin`|User name for the account that will be added as domain administrator. This is separate from the default administrator account. Note: This user is used for Self-Managed AD Scenario, when using AWS Directory Service for Microsoft AD "Admin" is the default regardless of the value provided.  provided.|Domain admin password
(`DomainAdminPassword`)|`**__Requires input__**`|Password for the domain admin user. Must be at least 8 characters containing letters, numbers, and symbols.
|===
.Self-managed Active Directory configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Domain controller 1 instance type
(`ADServer1InstanceType`)|`m5.xlarge`|Amazon EC2 instance type for the first Active Directory instance.|Domain controller 1 NetBIOS name
(`ADServer1NetBIOSName`)|`DC1`|NetBIOS name of the first Active Directory server (up to 15 characters).|Domain controller 1 private IP address
(`ADServer1PrivateIP`)|`10.0.0.10`|Fixed private IP for the first Active Directory server located in Availability Zone 1.|Domain controller 2 instance type
(`ADServer2InstanceType`)|`m5.xlarge`|Amazon EC2 instance type for the second Active Directory instance.|Domain controller 2 NetBIOS name
(`ADServer2NetBIOSName`)|`DC2`|NetBIOS name of the second Active Directory server (up to 15 characters).|Domain controller 2 private IP address
(`ADServer2PrivateIP`)|`10.0.32.10`|Fixed private IP for the second Active Directory server located in Availability Zone 2.
|===
.Amazon EC2 configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|EC2 key pair name
(`KeyPairName`)|`**__Requires input__**`|Name of an existing EC2 key pair. All instances will launch with this key pair.|Server1 NetBIOS Name
(`SqlFSxServerNetBIOSName1`)|`SqlFSx1`|NetBIOS name of the SQL server (up to 15 characters)|Server2 NetBIOS Name
(`SqlFSxServerNetBIOSName2`)|`SqlFSx2`|NetBIOS name of the SQL server (up to 15 characters)|Windows version
(`WindowsVersion`)|`Windows_Server-2019-English-Full-Base*`|Select Windows version to run SQL Server.|Workload Servers EC2 instance type
(`WorkloadInstanceType`)|`r5.2xlarge`|Type of EC2 instance for the Workload instances
|===
.Amazon FSx Windows File Share Configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|File share volume size
(`FileShareVolumeSize`)|`32`|Capacity of the volume used to store SQL Server files. Minimum value is 32 and maximum 65536. (GB)|File share throughput capacity (MB/s)
(`FileShareThroughputCapacity`)|`8`|File share throughput capacity, in 2 to the n'th power increments, where 3 <= n <= 11, i.e. (between 2^3 and 2^11).
|===
.Microsoft SQL Server FCI configurations
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|S3 bucket for SQL media
(`MSSQLMediaBucketName`)|`**__Requires input__**`|The S3 bucket name wherefrom MSSQL media can be downloaded. This string can include numbers, lowercase letters, uppercase letters, and hyphens (-). It cannot start or end with a hyphen (-).|S3 key for SQL media path
(`MSSQLMediaPathKey`)|`SQLServer2019-x64-ENU.iso`|The S3 bucket key wherefrom MSSQL media can be downloaded. This string can include numbers, lowercase letters, uppercase letters, hyphens (-), and forward slash (/).|Windows Server failover cluster name
(`SqlFSxWSFCName`)|`WSFC1`|Windows Server failover cluster name|FCI name
(`SqlFSxFCIName`)|`SqlFCI`|FCI name|SQL administrator account(s)
(`SQLAdminAccounts`)|`example\Admin`|Comma-separated user names will be used as MSSQL DB Administrator. It could be AD domain admin, other local or domain users.
|===
.AWS Quick Start Configuration
[width="100%",cols="16%,11%,73%",options="header",]
|===
|Parameter label (name) |Default value|Description|Quick Start S3 Bucket Name
(`QSS3BucketName`)|`aws-quickstart`|S3 bucket name for the Quick Start assets. This string can include numbers, lowercase letters, uppercase letters, and hyphens (-). It cannot start or end with a hyphen (-).|Quick Start S3 bucket region
(`QSS3BucketRegion`)|`us-east-1`|The AWS Region where the Quick Start S3 bucket (QSS3BucketName) is hosted. When using your own bucket, you must specify this value.|Quick Start S3 Key Prefix
(`QSS3KeyPrefix`)|`quickstart-microsoft-sql-fci-fsx/`|S3 key prefix for the Quick Start assets. Quick Start key prefix can include numbers, lowercase letters, uppercase letters, hyphens (-), and forward slash (/).
|===