
== Best practices for using {partner-product-name} on AWS
// Provide post-deployment best practices for using the technology on AWS, including considerations such as migrating data, backups, ensuring high performance, high availability, etc. Link to software documentation for detailed information.

For best practices about using OpenEdge on AWS, see the https://docs.progress.com[Progress Information Hub].

== Security
// Provide post-deployment best practices for using the technology on AWS, including considerations such as migrating data, backups, ensuring high performance, high availability, etc. Link to software documentation for detailed information.

The OpenEdge application is accessed by default via a web browser using HTTP. For information about how to implement HTTPS access, see the  https://docs.progress.com[Progress Information Hub].

You can use the *RemoteAccessCIDR* and *WebserverCIDR* parameters to restrict the IP addresses that you use to access the application.