// Add steps as necessary for accessing the software, post-configuration, and testing. Don’t include full usage instructions for your software, but add links to your product documentation for that information.
When the stack is successfully created, you can access the PAS for OpenEdge server and the web server using the values `PASOEURL` and `WebURL`, respectively, from the *Outputs* tab of the top-level stack.