This Quick Start requires two subscriptions: one to the Amazon Machine Image (AMI) for Qumulo (either the 1 or 12-TB usable capacity option) and the other for AMI for Teradici, both of which are available from https://aws.amazon.com/marketplace/[AWS Marketplace^]. Additional pricing, terms, and conditions may apply. For instructions, see link:#_deployment_steps[Deployment steps] section.
