// Replace the content in <>
// Identify your target audience and explain how/why they would use this Quick Start.
//Avoid borrowing text from third-party websites (copying text from AWS service documentation is fine). Also, avoid marketing-speak, focusing instead on the technical aspect.

This guide provides instructions for deploying the {partner-product-short-name} for https://aws.amazon.com/iot-sitewise/[AWS IoT SiteWise] reference architecture on the AWS Cloud. This Quick Start is for reliability engineers and operations managers to collect, model, and monitor Urban.io sensor data with AWS IoT SiteWise.
