==== Prepare your AWS account

To ensure proper synchronization of the {partner-product-short-name} domain model with AWS IoT SiteWise, you must https://docs.aws.amazon.com/servicequotas/latest/userguide/request-quota-increase.html[request increases] to the following AWS IoT SiteWise quotas:

* *Number of child assets per parent asset.* The default is 100. Request 500.
* *Number of asset models per hierarchy tree.* The default is 20. Request 50.

NOTE: You must request these increases to successfully prepare your {partner-product-short-name} account in the next section. For more information, see https://docs.aws.amazon.com/servicequotas/latest/userguide/request-quota-increase.html[Requesting a quota increase].

==== Prepare your {partner-company-short-name} account

This Quick Start requires an Asset Monitoring IIoT Datastream subscription from Urban.io, available on https://aws.amazon.com/marketplace/pp/prodview-mw4hwqut2buww?ref_=srh_res_product_title[AWS Marketplace]. After subscribing, Urban.io will contact you and guide you through the installation. For more information about subscriptions, https://support.urban.io/[contact Urban.io].

NOTE: After deploying the Quick Start, you must configure integration between your Urban.io account and AWS IoT SiteWise. For more information, see link:#_post_deployment_steps[Post-deployment steps] later in this guide.
